\documentclass[aspectratio=169,10pt]{beamer}
\usetheme[progressbar=head,numbering=fraction,sectionpage=none]{metropolis}

\usepackage{graphicx}
\usepackage{ulem}
\usepackage{xcolor}
\usepackage[scale=2]{ccicons}
\usepackage{pgfplots}
\usepackage{numprint}
\usepackage{booktabs}
\usepgfplotslibrary{dateplot}
\usepackage{hyperref}
\usepackage{multirow}
\usepackage{tcolorbox}
\usepackage{array}
\usepackage{xspace}

\title{Ph.D. Research proposal: Physics Based Security}
\subtitle{}
\date{}
\author{Arthur Grisel-Davy}
\institute{University of Waterloo, Canada}

\begin{document}

\maketitle

\begin{frame}{Introduction}
    \begin{center}
        \only<1>{\includegraphics[width=\textwidth]{images/main_illustration_p1.pdf}}
        \only<2>{\includegraphics[width=\textwidth]{images/main_illustration_p2.pdf}}
    \end{center}
\end{frame}

\begin{frame}{Introduction}
    \begin{center}
    {\LARGE 1. We cannot entrust machines to assess their own integrity.}
    \includegraphics[width=0.9\textwidth]{images/trust.pdf}
    \end{center}
\end{frame}

\begin{frame}{Introduction}
    \begin{center}
    {\LARGE 2. Process assessement require process-related information.}
    \end{center}
\end{frame}

%\begin{frame}{Introduction}
%    \begin{center}
%    {\LARGE 2. Process assessement require process-related information.}
%    \end{center}
%\end{frame}

\begin{frame}{Introduction}
    \begin{center}
        \only<1>{\includegraphics[width=\textwidth]{images/wein_p1.pdf}}
        \only<2>{\includegraphics[width=\textwidth]{images/wein_p2.pdf}}
    \end{center}
\end{frame}

\begin{frame}{Introduction}
    % Figure from the EMSOFT presentation with the different side channels and our solution
    \begin{center}
        \only<1>{\includegraphics[width=\textwidth]{images/main_illustration_p3.pdf}}
        \only<2>{\includegraphics[width=\textwidth]{images/main_illustration_p4.pdf}}
    \end{center}
\end{frame}

\begin{frame}{Features of Side-Channels}
    \begin{columns}
    \begin{column}{0.5\textwidth}
        {\color{green}Advantages}
        \begin{itemize}
            \item Easy to Measure
            \item Hard to Forge
            \item Independent from the System
            \item Low Intrusiveness
            \item No Client Required
        \end{itemize}
    \end{column}
    \begin{column}{0.5\textwidth}
        {\color{red}Inconvenients}
        \begin{itemize}
            \item Aggregated Signal of Multiple Components
            \item Noisy and Non-Actionable Information
            \item Require New Processing Tools
        \end{itemize}
    \end{column}
    \end{columns}
\end{frame}


\begin{frame}{Preliminary Work}
    % Figure from the EMSOFT presentation with the different side channels and our solution
    \begin{center}
        \only<1>{\includegraphics[width=\textwidth]{images/timeline_pastwork_p1.pdf}}
        \only<2>{\includegraphics[width=\textwidth]{images/timeline_pastwork_p2.pdf}}
        \only<3>{\includegraphics[width=\textwidth]{images/timeline_pastwork_p3.pdf}}
        \only<4>{\includegraphics[width=\textwidth]{images/timeline_pastwork_p4.pdf}}
        \only<5>{\includegraphics[width=\textwidth]{images/timeline_pastwork_p5.pdf}}
        \only<6>{\includegraphics[width=\textwidth]{images/timeline_pastwork_p6.pdf}}
    \end{center}
\end{frame}

%\begin{frame}{Prelimirary Work - EET1}
%    \begin{figure}
%        \centering
%        \includegraphics[width=\textwidth]{images/overview_eet1.pdf}
%    \end{figure}
%    Attacks: Firmware Changes, SSH Logs Tempering, Hardware Tempering
%\end{frame}
%
%\begin{frame}{Prelimirary Work - EET1: Firmware}
%    \begin{figure}
%        \centering
%        \includegraphics[height=0.9\textheight]{images/Firmware_Comparison_TD_direct.pdf}
%    \end{figure}
%\end{frame}
%
%\begin{frame}{Prelimirary Work - EET1: Firmware}
%    \begin{table}[ht]
%    \centering
%    \begin{tabular}{lccc}
%        \toprule
%        \textbf{Attack} & \textbf{Model} & \textbf{F1 Score} & \textbf{Accuracy} \tabularnewline
%        \midrule
%        \multirow{2}*{Firmware Changes DC} & RFC & \numprint[\%]{100}  & \numprint[\%]{100} \tabularnewline
%                                           & SVM & \numprint[\%]{96.8} & \numprint[\%]{99.3}\tabularnewline
%        \midrule
%        \multirow{3}*{SSH Logs Tempering}& RFC &    \numprint[\%]{95}  & \numprint[\%]{97} \tabularnewline
%                                         & SVM &    \numprint[\%]{96} & \numprint[\%]{98} \tabularnewline
%                                         & 1D-CNN & \numprint[\%]{93} & \numprint[\%]{96} \tabularnewline
%        \midrule
%        \multirow{3}*{Hardware Tempering} & DC SVM &  & \numprint[\%]{100} \tabularnewline
%                                          & DC KNN &  & \numprint[\%]{100} \tabularnewline
%                                          & AC SVM &  & \numprint[\%]{99.5} \tabularnewline
%        \bottomrule
%    \end{tabular}
%\end{table}
%
%    \footnote{Published in \textit{Side-channel Based Runtime Intrusion Detection for Network Equipment} at MLCS (Workshop of ECML-PKDD 2023)}
%\end{frame}
%
%\begin{frame}{ Preliminary Work - xPSU}
%    \begin{figure}
%        \centering
%        \includegraphics[height=0.9\textheight]{images/xpsu_illustration.pdf}
%    \end{figure}
%\end{frame}
%
%\begin{frame}{Preliminary Work - SDS \& BPV}
%    \begin{figure}
%        \centering
%        \includegraphics[width=\textwidth]{images/sds_illustration.pdf}
%    \end{figure}
%\end{frame}
%
%\begin{frame}{Preliminary Work - SDS \& BPV}
%    \begin{figure}
%        \centering
%        \includegraphics[width=0.9\textwidth]{images/training_bpv.pdf}
%    \end{figure}
%\end{frame}
%
%\begin{frame}{Preliminary Work - SDS \& BPV}
%\begin{table}[ht]
%\centering
%\begin{tabular}{lccc}
%    \toprule
%    \textbf{Test Case} & \textbf{Experiment} & \textbf{F1 Score} \tabularnewline
%    \toprule
%    \multirow{4}*{Network Devices} & TP-Link switch & 0.87\tabularnewline
%                                   & HP switch & 0.98 \tabularnewline
%                                   & Asus Router & 1.00\tabularnewline
%                                   & Linksys Router & 0.92\tabularnewline
%    \midrule
%    \multirow{4}*{Drone} & Original & 1.00\tabularnewline
%                         & Compiled & 1.00\tabularnewline
%                         & Low Battery & 1.00\tabularnewline
%                         & Bootloader Bug & 1.00\tabularnewline
%    \bottomrule
%\end{tabular}
%\end{table}
%    \footnote{Published in \textit{Work-in-Progress: Boot Sequence Integrity Verification with Power Analysis} at EMSOFT 2022\\
%    and in \textit{Independent Boot Process Verification using Side-Channel Power Analysis} at QRS 2023}
%\end{frame}

\begin{frame}{Future Work}
    \begin{figure}
        \centering
        \includegraphics[width=\textwidth]{images/intro_dsd.pdf}
    \end{figure}
\end{frame}

\begin{frame}{Main problem Statement}
    \textbf{Problem Statement 1}
    \textit{
    Given a discretized time series $t$ and a set of patterns $P=\{\chi, P_1,\dots, P_n\}$, identify an injective mapping $m_{SSSM}:\mathbb{N}\longrightarrow P$ such that every sample $t[i]$
    maps to a pattern in $P$ with the condition that the sample matches an occurence of the pattern in $t$.
}
\end{frame}

\begin{frame}{Overview of the Problems}
    % Figure from the EMSOFT presentation with the different side channels and our solution
    \begin{center}
        \only<1>{\includegraphics[width=\textwidth]{images/map_illustration_Page 1.pdf}}
        \only<2>{\includegraphics[width=\textwidth]{images/map_illustration_Page 2.pdf}}
        \only<3>{\includegraphics[width=\textwidth]{images/map_illustration_Page 3.pdf}}
        \only<4>{\includegraphics[width=\textwidth]{images/map_illustration_Page 4.pdf}}
    \end{center}
\end{frame}

\begin{frame}{Current Work - SSSM}
    \begin{figure}
        \centering
        \includegraphics[width=0.9\textwidth]{images/dsd_illustration.pdf}
    \end{figure}
\end{frame}
\begin{frame}{Current Work - SSSM}
    \begin{figure}
        \centering
        \includegraphics[width=0.9\textwidth]{images/preds.pdf}
    \end{figure}
\end{frame}
\begin{frame}{Current Work - SSSM}
    \begin{figure}
        \centering
        \includegraphics[width=0.9\textwidth]{images/dsd_acc.pdf}
    \end{figure}
\end{frame}

\begin{frame}{Current Work - SSSM}
    Next Steps:
    \begin{itemize}
        \item Evaluate performances on a wider range of devices.
        \item Increase realiability of results (investigate differential shrinkage).
    \end{itemize}
\end{frame}

\begin{frame}{Planned Work - SSMM}
    \begin{figure}
        \centering
        \includegraphics[width=0.9\textwidth]{images/ssmm_illustration.pdf}
    \end{figure}
\end{frame}

\begin{frame}{Planned Work - SSMM}
    Next Steps:
    \begin{itemize}
        \item Developp capture system.
        \item Evolve the SSSM system for multi-variate support.
        \item Evaluate performances.
    \end{itemize}
\end{frame}


\begin{frame}{Planned Work - MSSM}
    \begin{figure}
        \centering
        \includegraphics[height=0.9\textheight]{images/mssm_illustration.pdf}
    \end{figure}
\end{frame}

\begin{frame}{Planned Work - MSSM}
    Next Steps:
    \begin{itemize}
        \item Developp new method for AC states detection.
        \item Investigate signal disembiguation techniques.
    \end{itemize}
\end{frame}

\begin{frame}{Conclusion}
    \begin{itemize}[<+- | alert@+>]
        \item Preliminary work illustrates potential and identified a gap.
        \item Three main problems identified:
            \begin{itemize}[<+- | alert@+>]
                \item SSSM shows good results so far.
                \item SSMM is an extension of preliminary work.
                \item MSSM remains fully to study.
            \end{itemize}
        \item This topic is captivating to me.
    \end{itemize}
\end{frame}

\begin{frame}[standout]
Thank you for your attention.
\end{frame}


\end{document}

